<template>
    <q-layout>
        <div
            id="csc-login"
            class="row"
        >
            <div class="column col-lg-4 col-xl-4 col-md-3 gt-sm" />
            <div class="column col-12 col-md-6 col-lg-4 col-xl-4">
                {{ $t('404 Not Found') }}
            </div>
            <div class="column col-lg-4 col-xl-4 col-md-3 gt-sm" />
        </div>
    </q-layout>
</template>

<script>
export default {
    // eslint-disable-next-line vue/multi-word-component-names
    name: 'Error404'
}
</script>
