INSERT INTO version (table_name, table_version) values ('pl_pipes','1');
CREATE TABLE pl_pipes (
    id INT(10) UNSIGNED AUTO_INCREMENT PRIMARY KEY NOT NULL,
    pipeid VARCHAR(64) DEFAULT '' NOT NULL,
    algorithm VARCHAR(32) DEFAULT '' NOT NULL,
    plimit INT DEFAULT 0 NOT NULL
) ENGINE=MyISAM;

